main1-core1-oc3.vie1 212.69.163.113

(59)

core1-vie2-oc12.vie1 core1-vie2-oc12-2.vie1 (805)

main2-core1-oc3.vie1 (807) main2-core1-oc12.vie2 main2-core2-oc12.vie2 212.69.178.3

(243)

main1-core1-oc12.vie2 main1-core2-oc12.vie2 (810) vie2-fra2-oc12-1.vie2 core1-core2-oc48.vie2 core1-vie2-oc3.vie3 (808)

vie2-fra2-oc12-2.vie2 core2-core1-oc48.vie2 core2-vie2-oc3.vie3 (809) core2-vie2-oc3.vie1 core2-core1-oc3.vie1 (806)

208.185.29.151 (111) 212.69.162.21 (177)

212.69.173.254 212.69.174.254 212.69.175.254 212.69.176.117 (63) 212.69.166.27 (237) vix core1-vie3-oc3.vie2 core1-vie3-oc3-2.vie2 (426)